caltool/schedule_ui RecurringInfoSubdialog.java Page 1

Loading vc-cvs...
   1 package caltool.schedule_ui;
   2
   3 import caltool.schedule.*;
   4 import mvp.*;
   5 import java.util.*;
   6 import javax.swing.*;
   7 import java.awt.*;
   8 import java.awt.event.*;
   9
  10 /****
  11 *
  12 * Class RecurringInfoSubDialog is a component of the ScheduleAppointment,
  13 * ConfirmMeeting, and ScheduleTask Dialogs. The companion model is
  14 * RecurringInfo. RecurringInfoSubDialog displays the row of recurring
  15 * information in its varying forms, including the monthly details dialog when
  16 * appropriate.
  17 *
  18 * A meeting request dialog has a slightly different version of the recurring
  19 * info row. The subclass RecurringInfoMeetingRequestSubDialog displays this
  20 * information.
  21 *
  22 */
  23 public class RecurringInfoSubdialog extends View {
  24
  25 /**
  26 * Construct this with a parent view. Since this is a subview, it need not
  27 * have its own model, since it only handles view details. The parent
  28 * dialogs for appointments, meetings, and tasks communicate with the
  29 * model.
  30 */
  31 public RecurringInfoSubdialog(Screen screen,
  32 ScheduleAppointmentDialog parentView) {
  33 super(screen, null);
  34 this.parentView = parentView;
  35
  36 maxComponentHeight = 1.9;
  37 maxComponentWidth = 1200;
  38 }
  39
  40 /**
  41 * Compose this as the default configuration consisting of a recurring
  42 * checkbox, a interval combo box, and the weekly interval details.
  43 */
  44 public Component compose() {
  45
  46 Box hbox = Box.createHorizontalBox();
  47
  48 JLabel recurringLabel = new JLabel("Recurring? ");
  49 recurringLabel.setForeground(Color.black);
  50 recurringCheckBox = new JCheckBox();
  51 recurringCheckBox.addActionListener(
  52 new RecurringCheckBoxListener(this, parentView));
  53
  54 intervalLabel = new JLabel("Interval: ");
  55 intervalLabel.setForeground(Color.black);

                                                                                          56 intervalLabel.setEnabled(false);
                                                                                          57 String[] selections = {"weekly", "biweekly", "monthly", "yearly"};
                                                                                          58 intervalComboBox = new JComboBox(selections);
                                                                                          59 intervalComboBox.setEnabled(false);
                                                                                          60 intervalComboBox.setMaximumSize(
                                                                                          61 new Dimension(maxComponentWidth, (int)(maxComponentHeight *
                                                                                          62 intervalComboBox.getFont().getSize())));
                                                                                          63
                                                                                          64 hbox.add(Box.createHorizontalStrut(15));
                                                                                          65 hbox.add(recurringLabel);
                                                                                          66 hbox.add(recurringCheckBox);
                                                                                          67 hbox.add(Box.createHorizontalStrut(10));
                                                                                          68 hbox.add(intervalLabel);
                                                                                          69 hbox.add(intervalComboBox);
                                                                                          70 hbox.add(Box.createHorizontalStrut(15));
                                                                                          71 hbox.add(composeWeeklyCheckBoxes());
                                                                                          72 hbox.add(Box.createHorizontalStrut(15));
                                                                                          73
                                                                                          74 return hbox;
                                                                                          75
                                                                                          76 }
                                                                                          77
                                                                                          78 /**
                                                                                          79 * Compose the seven day-of-the-week checkboxes.
                                                                                          80 */
                                                                                          81 protected Box composeWeeklyCheckBoxes() {
                                                                                          82 Box hbox = Box.createHorizontalBox();
                                                                                          83
                                                                                          84 hbox.add(composeDayCheckBox(sunCheckBox = new JCheckBox(),
                                                                                          85 sunLabel = new JLabel("S")));
                                                                                          86 sunLabel.setForeground(Color.black);
                                                                                          87 hbox.add(composeDayCheckBox(monCheckBox = new JCheckBox(),
                                                                                          88 monLabel = new JLabel("M")));
                                                                                          89 monLabel.setForeground(Color.black);
                                                                                          90 hbox.add(composeDayCheckBox(tueCheckBox = new JCheckBox(),
                                                                                          91 tueLabel = new JLabel("T")));
                                                                                          92 tueLabel.setForeground(Color.black);
                                                                                          93 hbox.add(composeDayCheckBox(wedCheckBox = new JCheckBox(),
                                                                                          94 wedLabel = new JLabel("W")));
                                                                                          95 wedLabel.setForeground(Color.black);
                                                                                          96 hbox.add(composeDayCheckBox(thuCheckBox = new JCheckBox(),
                                                                                          97 thuLabel = new JLabel("T")));
                                                                                          98 thuLabel.setForeground(Color.black);
                                                                                          99 hbox.add(composeDayCheckBox(friCheckBox = new JCheckBox(),
                                                                                         100 friLabel = new JLabel("F")));
                                                                                         101 friLabel.setForeground(Color.black);
                                                                                         102 hbox.add(composeDayCheckBox(satCheckBox = new JCheckBox(),
                                                                                         103 satLabel = new JLabel("S")));
                                                                                         104 satLabel.setForeground(Color.black);
                                                                                         105
                                                                                         106 return hbox;
                                                                                         107 }
                                                                                         108
                                                                                         109 /**
                                                                                         110 * Compose one of the weekly check boxes as a vbox with a label on top and
                                                                                         111 * check box below. I couldn’t find any way to have JFC put its built-in

caltool/schedule_ui RecurringInfoSubdialog.java Page 2

112 * check box label on top instead of to the right. Whatever.
113 */
114 Box composeDayCheckBox(JCheckBox cbox, JLabel label) {
115 Box vbox = Box.createVerticalBox();
116 label.setAlignmentX(Box.CENTER_ALIGNMENT);
117 label.setEnabled(false);
118 cbox.setAlignmentX(Box.CENTER_ALIGNMENT);
119 cbox.setEnabled(false);
120 vbox.add(label);
121 vbox.add(cbox);
122
123 return vbox;
124 }
125
126 public void update(Observable o, Object arg) {
127 // to be refined
128 }
129
130
131 /** The parent apppointment dialog view. */
132 ScheduleAppointmentDialog parentView;
133
134 /** The checkbox that indicates whether the scheculed item recurs. */
135 protected JCheckBox recurringCheckBox;
136
137 /** The interval combobox for weekly, biweekly, monthly, or yearly. */
138 protected JComboBox intervalComboBox;
139
140 /** The label for the interval combobox. It’s a data field since it needs
141 to be set enabled or disabled dynamically */
142 protected JLabel intervalLabel;
143
144 /** The Sunday checkbox. */
145 protected JCheckBox sunCheckBox;
146
147 /** The Sunday label. */
148 protected JLabel sunLabel;
149
150 /** The Monday checkbox. */
151 protected JCheckBox monCheckBox;
152
153 /** The Monday label. */
154 protected JLabel monLabel;
155
156 /** The Tuesday checkbox. */
157 protected JCheckBox tueCheckBox;
158
159 /** The Tuesday label. */
160 protected JLabel tueLabel;
161
162 /** The Wednesday checkbox. */
163 protected JCheckBox wedCheckBox;
164
165 /** The Wednesday label. */
166 protected JLabel wedLabel;
167

                                                                                        168 /** The Thursday checkbox. */
                                                                                        169 protected JCheckBox thuCheckBox;
                                                                                        170
                                                                                        171 /** The Thursday label. */
                                                                                        172 protected JLabel thuLabel;
                                                                                        173
                                                                                        174 /** The Friday checkbox. */
                                                                                        175 protected JCheckBox friCheckBox;
                                                                                        176
                                                                                        177 /** The Friday label. */
                                                                                        178 protected JLabel friLabel;
                                                                                        179
                                                                                        180 /** The Saturday checkbox. */
                                                                                        181 protected JCheckBox satCheckBox;
                                                                                        182
                                                                                        183 /** The Saturday label. */
                                                                                        184 protected JLabel satLabel;
                                                                                        185
                                                                                        186 /** The max height of a text field or combobox; this is necessary since
                                                                                        187 these components strech when the outer frame is resized, and look very
                                                                                        188 funky when they do */
                                                                                        189 protected final double maxComponentHeight;
                                                                                        190
                                                                                        191 /** The max width of any component; this is only necessary because the max
                                                                                        192 height cannot be set separately, so we must pick some max width. */
                                                                                        193 protected final int maxComponentWidth;
                                                                                        194
                                                                                        195 }