InterViews Reference Manual

Version 2.6

February 1990

Computer Systems Laboratory Departments of Electrical Engineering and Computer Science Stanford University Stanford, CA 94305

Copyright (c) 1987, 1988, 1989, 1990 The Board of Trustees of the Leland Stanford Junior University.

Permission to copy this manual or any portion thereof as necessary for use of this software is hereby granted provided this copyright notice and statement of permission are included.